<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">\hypertarget{md_doc_help_kdb_list_tools_autotoc_md2618}{}\doxysection{SYNOPSIS}\label{md_doc_help_kdb_list_tools_autotoc_md2618}
{\ttfamily kdb list-\/tools}\hypertarget{md_doc_help_kdb_list_tools_autotoc_md2619}{}\doxysection{DESCRIPTION}\label{md_doc_help_kdb_list_tools_autotoc_md2619}
This command lists all the external tools that are available to Elektra. In the first line it prints where external tools are located.

The tool itself is extern.\hypertarget{md_doc_help_kdb_list_tools_autotoc_md2620}{}\doxysection{ENVIRONMENT}\label{md_doc_help_kdb_list_tools_autotoc_md2620}

\begin{DoxyItemize}
\item {\ttfamily KDB\+\_\+\+EXEC\+\_\+\+PATH}\+: Path to additional external tools. Can contain multiple paths separated with \+:.
\end{DoxyItemize}\hypertarget{md_doc_help_kdb_list_tools_autotoc_md2621}{}\doxysection{OPTIONS}\label{md_doc_help_kdb_list_tools_autotoc_md2621}
Currently no option provided.\hypertarget{md_doc_help_kdb_list_tools_autotoc_md2622}{}\doxysection{SEE ALSO}\label{md_doc_help_kdb_list_tools_autotoc_md2622}

\begin{DoxyItemize}
\item {\ttfamily kdb list-\/commands} to list internal kdb commands 
\end{DoxyItemize}</pre></body></html>